         180           8
 -0.408584612558424      -0.811213009078972       -1.17262984636187     
  -1.55556915877156       -1.87701672810061       -2.11652335873098     
  -2.27331836073793       -2.51384106384701     
  -9.69127864840608       -10.0974148119343       -10.3730491485354     
  -10.5787515200550       -10.8398856328908       -11.1518233202823     
  -11.4173768718359       -11.6342015053554     
  3.788152351864883E-004  0.000000000000000E+000
  0.991815794639956       0.000000000000000E+000
  0.994645502977079       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
