         180           8
   2.89979536881610        2.51543109252614        2.19743613287764     
   1.89184724581610        1.60699534883359        1.36214463808786     
   1.22522818960684        1.03097576930522     
  -14.5384436872748       -15.0564581476097       -15.3144703441089     
  -15.5847329984111       -15.8545606596214       -16.1012926446938     
  -16.4249584482959       -16.7828420195273     
 -4.131222593251190E-004  0.000000000000000E+000
  0.992098440515424       0.000000000000000E+000
  0.995101998569538       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
