         180           8
   3.52847327185546        3.08883183099378        2.72789067596510     
   2.37263443745237        2.04285817003927        1.79201705301637     
   1.55238316752801        1.56408136130696     
  -14.9266704078054       -15.3382778203507       -15.6515499679637     
  -15.9091457103821       -16.1473534041885       -16.4130148097829     
  -16.7195458546429       -17.1347139821462     
 -5.632773961116919E-004  0.000000000000000E+000
  0.992411241505238       0.000000000000000E+000
  0.995488712593281       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
