         180           8
   3.14452938771460        2.71012244619813        2.41533275515989     
   2.09980181645041        1.81303748483869        1.49372854878105     
   1.24115556061596        1.22285487738288     
  -14.2607340361264       -14.6803236727444       -15.0685063687059     
  -15.3761955129563       -15.6726315166375       -15.9498097731095     
  -16.2733921096110       -17.2117782486854     
 -7.141119520965792E-004  0.000000000000000E+000
  0.992733592199164       0.000000000000000E+000
  0.995722566043721       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
