         180           8
   6.75205511182215        6.04702089406050        5.44930826275842     
   4.85414095296979        4.26366832530960        3.65956281305575     
   3.07649475276753        2.55886718563254     
  -10.5695287345023       -10.6231596374136       -10.8436863004743     
  -11.0823270971903       -11.2772705420129       -11.5637116306392     
  -11.8063304020084       -11.9552496783123     
 -8.262089061014184E-004  0.000000000000000E+000
  0.992856594652926       0.000000000000000E+000
  0.996088407347818       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
