         180           8
   1.72992986616350        1.34971222165552        1.02364703710567     
  0.726838998037103       0.459054340389360       0.170563838081850     
  5.299920691541769E-003 -0.165082050799448     
  -9.10970272653839       -9.36541160041168       -9.59814482253777     
  -9.86441469452185       -10.1072815203752       -10.3003844980515     
  -10.5403423505915       -10.7721493854535     
  6.468289917288089E-004  0.000000000000000E+000
  0.991818421337899       0.000000000000000E+000
  0.994854571152792       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
