         180           8
   2.43865242133771        2.02959651353274        1.73260231448437     
   1.37373552059833        1.03762685371250       0.805501547389912     
  0.643391162309912       0.556643766544762     
  -8.90101942095056       -9.15344980338649       -9.44728473430736     
  -9.69619316410433       -9.90407912137299       -10.1234445724205     
  -10.4093396958523       -10.7805337500107     
  6.362433503232960E-004  0.000000000000000E+000
  0.991971649445908       0.000000000000000E+000
  0.994981320777510       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
