         180           8
   2.00996485578685        1.60790385317211        1.31237942580193     
  0.993144126353928       0.651107584717805       0.409232045361280     
  0.230237030331785       5.034055876760269E-002
  -9.15486612764980       -9.36453581071620       -9.66596497303194     
  -9.91713187869568       -10.1105516570477       -10.3375451765909     
  -10.6022084603509       -10.7920458636435     
  6.692344226381726E-004  0.000000000000000E+000
  0.991853387358545       0.000000000000000E+000
  0.995028900799661       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
