         180           8
   1.85334392826661        1.58182273682542        1.24537922351301     
  0.958339912222806       0.647522360052157       0.408456886770022     
  0.277157878467044       0.172936827119252     
  -9.05667586044543       -9.28444568906832       -9.54070344173363     
  -9.80469439459405       -10.0124106567503       -10.2495998492285     
  -10.5873728963049       -10.7865826364702     
  6.286093932507080E-004  0.000000000000000E+000
  0.991963191423952       0.000000000000000E+000
  0.995059606693929       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
