         180           3
   6.06065583784794        7.69316363372173        9.71512418929762     
   10.1838694832379        10.9073213473813        11.7183397594152     
 -1.332598931111552E-003  0.000000000000000E+000
   1.00130205612907       0.000000000000000E+000
  0.998245249660472       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
