         180           3
   5.90301190450874        7.48200815421925        9.62577202158322     
   10.1016110031222        10.8020320260386        11.6661805939596     
 -1.308168668054186E-003  0.000000000000000E+000
   1.00138196000408       0.000000000000000E+000
  0.998318755370027       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
