         180           8
   3.22548012167773        3.08111244248507        2.89345453242201     
   2.74386281895833        2.59491809537497        2.43379782229568     
   2.25737111967264        2.20938651213503     
  -9.65521798948356       -9.38742137699027       -9.09991734281097     
  -8.72020741270141       -8.30043044298401       -7.89000783430790     
  -7.42382198181664       -7.12063741962636     
  6.687702490820663E-004  0.000000000000000E+000
  0.991979396594350       0.000000000000000E+000
  0.994839373214195       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
