         180           8
   2.33516312526667        2.03276642529272        1.68379881594152     
   1.36896901231732        1.08608312863541       0.851687441292409     
  0.613438797644283       0.474685291519275     
  -10.0495712216303       -10.3162723406225       -10.5491275150889     
  -10.7616172134677       -11.0189234283816       -11.2510317906559     
  -11.4302198262553       -11.7184149117847     
  4.490584871667842E-004  0.000000000000000E+000
  0.991979308634548       0.000000000000000E+000
  0.994822273401614       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
