         180           8
   2.37540778991806        2.00419319479738        1.65822361251056     
   1.31416071216033        1.01906786293812       0.772814080297024     
  0.555159459412253       0.452227700114980     
  -9.90722259551674       -10.2150298564530       -10.5119991944057     
  -10.7178182639888       -10.9171990204969       -11.1588927165844     
  -11.4094196745920       -11.7383097689506     
  4.477244859655272E-004  0.000000000000000E+000
  0.992053885101769       0.000000000000000E+000
  0.994920226628183       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
