         180           8
   6.12438960921240        5.57029341733579        5.03995153367944     
   4.49786494934364        4.00646898703753        3.58834561006587     
   3.19272129615975        2.84617423050325     
   9.66955821248633        9.82966831763088        9.93005469090591     
   10.0130999278983        10.1029797483270        10.1723226351511     
   10.1419818914382        10.1792049541815     
 -1.412262486088167E-003  0.000000000000000E+000
   1.00128129241178       0.000000000000000E+000
  0.998490667162805       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
