         180           8
   2.61333927604673        2.26469351777239        1.89124217820435     
   1.56140925172519        1.25229229568241       0.975600446887202     
  0.771114562503132       0.572616769947003     
  -10.1596289761208       -10.3552338306872       -10.5838327285190     
  -10.8029262625710       -11.0023444638802       -11.2236649617840     
  -11.5151629546928       -11.7942422262775     
  4.097421183045789E-004  0.000000000000000E+000
  0.992207333789491       0.000000000000000E+000
  0.995020349044690       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
