         180           8
   2.94933214926488        2.55883336626029        2.17009843434533     
   1.84170433000969        1.50278498456518        1.21327645754900     
   1.02953327521973       0.890458694129069     
  -9.89605700279775       -10.2149148618903       -10.4341054655238     
  -10.7402755440422       -11.0378360078282       -11.2534080632433     
  -11.5191598686026       -11.8216073941511     
  3.562195831976918E-004  0.000000000000000E+000
  0.992260313150034       0.000000000000000E+000
  0.995101646890702       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
