         180           8
   1.94115178280380        1.63388540442379        1.28562981109300     
  0.995153113016604       0.732041532432827       0.494389143495907     
  0.348670327797700       0.230036737324465     
  -10.0159669255134       -10.4110246783957       -10.6568863778311     
  -10.9104958251284       -10.8826372417838       -10.4969241787713     
  -10.1498983172455       -9.87179715887711     
  4.806954921248966E-004  0.000000000000000E+000
  0.991794058317545       0.000000000000000E+000
  0.994448076109002       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
