         180           3
   6.42535354104588        4.55230013706302        3.11061197914007     
   10.0653042187125        10.2884420166450        10.5530881951241     
 -1.393580651815351E-003  0.000000000000000E+000
   1.00122821083408       0.000000000000000E+000
  0.998283485017326       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
