         180           8
   2.11502218820347        1.66037843032320        1.36568938603836     
   1.06261132575855       0.745602703841730       0.476300490279190     
  0.314495441311169       0.177008712122244     
  -10.1054724704521       -10.3804197676237       -10.6751232202034     
  -10.9402913752085       -11.1697033799583       -11.4371105716127     
  -11.6738033035095       -11.9929040394025     
  4.032585745775657E-004  0.000000000000000E+000
  0.991946515413535       0.000000000000000E+000
  0.994634909186494       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
