         180           8
   2.58778857579591        2.19035832243861        1.77531389499408     
   1.38743451966487        1.11982285607074       0.887948655657124     
  0.695192318329264       0.611470778801474     
  -10.2293425535219       -10.6244607289481       -10.9048631065611     
  -11.1842607524167       -11.4695089648848       -11.7631919592103     
  -12.0198537614630       -12.3505715344858     
  3.778154838105847E-004  0.000000000000000E+000
  0.992106294694277       0.000000000000000E+000
  0.994872669340590       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
