         180           8
   3.01189269794919        2.52912046043567        2.16901883781061     
   1.81569055873239        1.46932465929799        1.16952058937543     
  0.967431997874585       0.806279817043700     
  -10.2078724830117       -10.5246636246871       -10.7644166336971     
  -11.0056184227425       -11.2477377425311       -11.4475913493970     
  -11.6595421712205       -11.8348437663224     
  3.409186218747317E-004  0.000000000000000E+000
  0.992187318656839       0.000000000000000E+000
  0.995067833726179       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
