         180           8
   2.88434990970301        2.44728992336125        2.04765467525910     
   1.68222570876240        1.32944563405987        1.07707801471911     
  0.878805443989728       0.815529138225144     
  -9.78944305607167       -10.1848313295209       -10.4765739102939     
  -11.0388309807658       -11.6373993489736       -12.0165426423976     
  -12.2106211274459       -12.4625587549203     
  1.536872636834353E-004  0.000000000000000E+000
  0.992441145983606       0.000000000000000E+000
  0.995298824372797       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
