         180           8
   2.21421646999883        2.11703251401479        1.88987854513842     
   1.74094668586690        1.57434824699208        1.40481757627459     
   1.28088188202275        1.10897654241674     
  -7.63165961665902       -7.57716943232427       -7.04120292742452     
  -6.63898208659971       -6.24072411252387       -5.83110408218013     
  -5.39637788864294       -4.93587095605332     
  8.791367105312921E-004  0.000000000000000E+000
  0.991560838414749       0.000000000000000E+000
  0.994646235881617       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
