         180           8
   2.43946476745122        2.24471274965436        2.07945525720206     
   1.93199195285006        1.82685302363865        1.69172047240736     
   1.58800730663056        1.48932251375744     
  -7.89659996885305       -7.26639606903230       -6.85880554692783     
  -6.39384111196528       -5.95771341239884       -5.53516253057459     
  -5.07923553817412       -4.80169606712557     
  9.070626804751311E-004  0.000000000000000E+000
  0.991272212913984       0.000000000000000E+000
  0.993987326016312       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
