         180           8
   2.84613182507036        2.63896830627741        2.49285964304760     
   2.39003798173190        2.22778936173602        2.01360614272795     
   1.89823701858243        1.74779658264927     
  -9.21362155942312       -8.92707413388373       -8.63677226998511     
  -8.30801600082687       -7.89814445330248       -7.47493500824912     
  -7.05361616290634       -6.67115036559408     
  7.155188746011402E-004  0.000000000000000E+000
  0.991935730816776       0.000000000000000E+000
  0.994892266524199       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
