         180           8
   6.74293550046945        6.10099403321060        5.45890214792070     
   4.82801934151779        4.22510457010511        3.62701463640108     
   3.05447168940962        2.59685753419690     
  -8.64259342703600       -8.79513632855762       -8.92062009017674     
  -9.11165899735288       -9.28659673309781       -9.51741539553092     
  -9.70283441216068       -9.62402839727478     
  4.868067965708353E-005  0.000000000000000E+000
  0.992136110881887       0.000000000000000E+000
  0.995452365070298       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
