         180           8
   6.54410494686252        5.90398503500947        5.27051793688274     
   4.60738609353232        3.95454412230343        3.35193222609874     
   2.80612798777989        2.29397433028820     
  -8.02720207099423       -8.27473166912051       -8.49452284477499     
  -8.65326486272719       -8.88550830322209       -9.12366663590853     
  -9.27723033806795       -9.44817656730270     
 -1.098104059977117E-004  0.000000000000000E+000
  0.992566264836998       0.000000000000000E+000
  0.995503080649083       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
