         180           3
   12.5229880861953        10.4012772450667        8.42190175656618     
   9.47541959050626        9.35820548769269        9.79003076852246     
 -1.360354913043796E-003  0.000000000000000E+000
   1.00196243484799       0.000000000000000E+000
  0.999059062151234       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
