         180           8
   7.10813978263820        6.42514333614571        5.77026141476219     
   5.11324904006496        4.51249816274941        3.99162432116689     
   3.48127523132891        3.05042073151117     
  -9.22885101571913       -9.41102703099784       -9.66065062376932     
  -9.85315757788613       -9.96247956513512       -10.1263470086909     
  -10.0648357396103       -9.60867806368039     
 -1.780005770126492E-004  0.000000000000000E+000
  0.992851205660626       0.000000000000000E+000
  0.995898336274623       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
