         180           8
   7.32103406533730        6.65334270720121        6.01171715625680     
   5.34080023191748        4.73997311848080        4.14106358166166     
   3.53958567834731        2.99610902980675     
  -9.06458655162179       -9.23589487348539       -9.27558697013988     
  -9.50880788386310       -9.76467305758861       -9.95464451624821     
  -10.1534142406106       -10.2824849385208     
 -3.333137224646622E-004  0.000000000000000E+000
  0.993148688483543       0.000000000000000E+000
  0.996143754688824       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
