         180           8
   7.12955303827070        6.49213078463897        5.85061978740501     
   5.18743151489096        4.56852643988610        4.01148994710285     
   3.48216396844178        3.00777842595577     
  -8.71675389617883       -8.88628243253986       -9.02609432163460     
  -9.17291268028836       -9.29301964938148       -9.49200523783635     
  -9.73758462026083       -10.0206625156198     
 -3.688609035149894E-004  0.000000000000000E+000
  0.993409783459107       0.000000000000000E+000
  0.996432329065136       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
