         180           8
   4.67553462305272        4.50868561976845        4.34040511659638     
   4.17795298972384        4.02526880972628        3.90983351579369     
   3.76698085699856        3.70382554156128     
  -12.7485871289276       -12.6134651398339       -12.2618680359307     
  -11.8784959711117       -11.4957311081735       -11.0572122201305     
  -10.6004187957847       -10.1151753464220     
  7.487323709630761E-006  0.000000000000000E+000
  0.992900642459671       0.000000000000000E+000
  0.996154745812450       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
