         180           8
   5.05537817520108        4.80341327789881        4.63510196088968     
   4.49184528752142        4.35664897424952        4.19619548882837     
   4.04447194558754        3.87598218231083     
  -12.8561518336346       -12.6365657022356       -12.3600132030780     
  -11.9773496390558       -11.5800473055011       -11.1870195521727     
  -10.7327326675773       -10.2897650745676     
  5.853765568882250E-005  0.000000000000000E+000
  0.992866098069585       0.000000000000000E+000
  0.996087178616520       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
