         180           8
   4.57036035395166        4.48118141372687        4.32073708530484     
   4.16678547840236        3.99275651597213        3.82615534386162     
   3.70607897635454        3.56853198607934     
  -12.3082826242653       -12.1977443012256       -11.9569887406918     
  -11.6402208643489       -11.2184853857586       -10.8105794093006     
  -10.4670384398127       -10.0351383504487     
  5.025113157680453E-005  0.000000000000000E+000
  0.992857473463632       0.000000000000000E+000
  0.995978593052571       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
