         180           8
   6.69005978787809        6.07039173560091        5.40970751097218     
   4.79587457317102        4.18744400785453        3.62000684198876     
   3.07004764720431        2.56825071071447     
  -7.67565410965756       -7.73662596374030       -7.85520591558820     
  -8.00299722348289       -8.17611696634826       -8.43433868960782     
  -8.70474354939445       -9.01438610562717     
 -5.256982070111884E-005  0.000000000000000E+000
  0.992973840517330       0.000000000000000E+000
  0.995865550555667       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
