         180           8
   6.73409975789707        6.01976506483707        5.37755573639769     
   4.74096637256726        4.14804570036358        3.52945052397702     
   2.96286860210984        2.44818261753245     
  -7.57733187705440       -7.65309376508362       -7.77191642554426     
  -7.90783398729879       -8.04586595653727       -8.25160665135939     
  -8.51938534510873       -8.85176503058126     
 -1.440515738764934E-004  0.000000000000000E+000
  0.993263533518589       0.000000000000000E+000
  0.996050311607313       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
