         180           8
   3.63836427482568        3.22122190660343        2.85055495225562     
   2.50609755527251        2.20678461449460        1.93090972687587     
   1.74135981455356        1.60715558141404     
  -12.6440046083987       -12.8774382858851       -13.1371173354420     
  -13.3886719250244       -13.6225663537231       -13.8385346985322     
  -14.0677373280611       -14.4612361205294     
  1.850880459597019E-004  0.000000000000000E+000
  0.992475966974698       0.000000000000000E+000
  0.995605020143990       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
