         180           8
   3.22341079618144        2.87834222061470        2.55385423289193     
   2.21707192286406        1.94681938690315        1.70279229580135     
   1.50402845121515        1.43182260742899     
  -12.2747225071744       -12.7360380963012       -12.9731528359312     
  -13.2884597156666       -13.6140965467485       -13.8816788482769     
  -14.1636207146463       -14.5200617357813     
  1.904480734213189E-004  0.000000000000000E+000
  0.992494266874850       0.000000000000000E+000
  0.995579394062153       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
