         180           8
   3.86645962230754        3.69334407094794        3.56043863405104     
   3.41058988178375        3.23555592304142        3.08813040930858     
   2.94699062326970        2.88783831973024     
  -12.4519161349273       -12.1744472035980       -11.8823102653687     
  -11.5024648735257       -11.0545447461473       -10.6380985169772     
  -10.2510047516196       -9.79271661196266     
  2.124767728809433E-004  0.000000000000000E+000
  0.992484728003067       0.000000000000000E+000
  0.995546221124126       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
