         180           8
   3.56981839528381        3.17988387005971        2.75739122265506     
   2.39112847548711        2.08490342865173        1.76243030792111     
   1.52295550035620        1.43300396997506     
  -12.8181345185612       -13.1142987102609       -13.3701410074401     
  -13.6154937733108       -13.8308096465347       -14.0925353511054     
  -14.3474730906000       -14.5508143044586     
  2.012593080053025E-004  0.000000000000000E+000
  0.992351797906681       0.000000000000000E+000
  0.995227532013078       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
