         180           3
   5.08977133510147        3.29865665660299        2.14207244056672     
   8.68419408893084        8.00334696705949        8.91711073946939     
 -1.415972584378302E-003  0.000000000000000E+000
   1.00138799054583       0.000000000000000E+000
  0.998169530077938       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
