         180           8
   3.45414887326620        3.05984127383573        2.67619452678748     
   2.35605509200386        2.08505414155366        1.79727403416293     
   1.53764146302840        1.57567478370879     
  -12.9754256523805       -13.5653680650617       -14.0383263126279     
  -14.3930811009383       -14.7015225829096       -14.9495076849028     
  -15.2075090226950       -15.5547535063824     
  9.408911714528504E-005  0.000000000000000E+000
  0.992636879404748       0.000000000000000E+000
  0.995478118458790       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
