         180           8
   4.26788532357835        4.18129277087711        4.01943467395557     
   3.84583620638437        3.67061159021291        3.55378016322325     
   3.43338649354939        3.34805796549155     
  -13.6283309948695       -13.2796855941280       -12.9577074823287     
  -12.5603499754737       -12.1123904655093       -11.6959048707359     
  -11.3098603301961       -10.9149380544770     
  4.499155185405799E-005  0.000000000000000E+000
  0.992815988981186       0.000000000000000E+000
  0.995664669646920       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
