         180           8
   6.67640750434084        5.83222345424166        5.15926287159614     
   4.58849349239747        3.98228317751285        3.42289747685761     
   2.90824854183498        2.44681141457233     
  -9.37002905966382       -9.61682751568012       -10.2408417130610     
  -10.3347704821254       -10.4916360629323       -10.6505522781495     
  -10.6313972370318       -10.6668366732020     
 -1.581731638813677E-004  0.000000000000000E+000
  0.993131096970647       0.000000000000000E+000
  0.995713766413031       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
