         180           8
   4.08554899287006        3.67811666430682        3.33467447696067     
   2.98628527014898        2.70506706140778        2.42781779920133     
   2.16171330772382        2.18406035542620     
  -14.2020420929183       -14.5367703901956       -14.7474103763917     
  -14.9548160129497       -15.1975010488658       -15.3658716701994     
  -15.5690869457334       -15.8639585115878     
 -8.503292149420820E-005  0.000000000000000E+000
  0.992743045027197       0.000000000000000E+000
  0.995616309274689       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
