         180           8
   2.45613039871866        2.17554293378965        1.83208823267216     
   1.49586859177280        1.28958383891214        1.12312668107465     
  0.878735889864958       0.830715440679120     
  -14.0785157537034       -14.2467772082503       -14.4920217034035     
  -14.7029444324069       -14.9748644622639       -15.1791808557541     
  -15.3514910934934       -15.5517588476903     
 -1.791048339803840E-004  0.000000000000000E+000
  0.992858361140159       0.000000000000000E+000
  0.995745771150783       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
