         180           8
   4.44313525993180        4.10961258840669        3.72584854364270     
   3.36981368656470        3.04431366599339        2.71771636751070     
   2.48291544406066        2.35816796765303     
  -14.5005354449418       -14.8553148101623       -15.1244873414260     
  -15.4056021557911       -15.6568159869958       -15.8914646079079     
  -16.0935791778494       -16.3096341540462     
 -6.828060976951280E-005  0.000000000000000E+000
  0.992595709139542       0.000000000000000E+000
  0.995662422164057       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
