         180           8
   3.97972584227286        3.65107793189448        3.35709931871668     
   3.04649244673778        2.73485641096978        2.50374655354905     
   2.36700595757397        2.25032366365826     
  -14.3980957780676       -14.6763334069147       -15.0031970957449     
  -15.2980632378980       -15.6006291049373       -15.8166536264074     
  -16.0369115618242       -16.4717718349290     
 -9.454351250739677E-005  0.000000000000000E+000
  0.992803284371203       0.000000000000000E+000
  0.995754943396612       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
