         180           8
   4.36978626667710        3.99395974936013        3.70644330684506     
   3.43142265552479        3.05054016310122        2.72038429793800     
   2.53234093092752        2.48950293127552     
  -14.5246856769456       -14.8612687442518       -15.1353567233037     
  -15.3975410882464       -15.6068243544910       -15.8171316953516     
  -16.1194864733162       -16.3744755446662     
 -1.399580882441093E-004  0.000000000000000E+000
  0.992699875533936       0.000000000000000E+000
  0.995754594027484       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
